NAME	     RasWin32	   ; application's module name

DESCRIPTION  'RasWin Molecular Graphics Renderer'

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     1024


; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
	MainCallB     @1   ; name of window processing function
        CmndCallB     @2   ; name of command processing function 
	AboutCallB    @3   ; name of "About" processing function
	InfoCallB     @4   ; name of "Info" processing function
        DDECallB      @5   ; name of DDE server function
